E-01-006 Collaboration Meeting

Frank R. Wesselmann

University of Virginia

November 16, 2001

Analysis

Online / Offline Analysis Code / Runtime Setup “High Level Analysis”

E-01-006: Analysis

Online / Offline Analysis

same system for online and offline analyses ∗ eliminates duplication

well established

∗ differ in output generated

online: raw asymmetries, rates, histograms offline: Ntuples, histograms

Analysis Software

Hall C replay engine — two versions exist:

∗ “official” Hall C code (E99-117)

standard, well supported

∗ Gen01 code

out-of-plane raster, target field support of latest hardware changes

⇒ update Hall C code

Mark Jones

E-01-006: Analysis

Runtime Setup

Parameter Database, Calibrations ∗ initial setup

from Gen01, update during checkout

∗ ongoing maintenance, monitoring

expertise, strategy

Monitoring Utilities

∗ Histogram Slide Show, Statistical Tests

from Gen01, update during checkout

High-Level Analysis

Extracting Physics Asymmetry ∗ Tools to Combine Runs

adapt existing or make new

∗ Systematics

beam & target polarization, dilution factor