Run plan summary: A_⊥ first Scattering B_t Target p_o W_l – W_h Time angle Orientation GeV/c GeV hours 13.07^∘ Transverse NH_3 4.534 0.938 - 1.690 50 NH_3 3.969 1.500 - 2.000 26 ND_3 4.534 0.938 - 1.690 52 ND_3 3.969 1.500 - 2.000 26 Subtotal transverse 154 Longitudinal ND_3 4.534 0.938 - 1.690 48 ND_3 3.969 1.500 - 2.000 22 NH_3 4.534 0.938 - 1.690 35 NH_3 3.969 1.500 - 2.000 17 Subtotal longitudinal 122 Subtotal low Q^2 (13.07^∘) 276 35^∘ 10^∘ w.r. beam^{14}NH_3 2.406 1.11-1.77 140 Total 416