0.75 0.8 0.85 0.9 0.95 1 1.05 1.1

40 60 80 100 120

y_{pos}=10

θ_{nq}=0.06 θ_{nq}=0.07 θ_{nq}=0.08 θ_{nq}=0.09 θ_{nq}=0.10 θ_{nq}=0.11 θ_{nq}=0.12 θ_{nq}=0.13 θ_{nq}=0.14 θ_{nq}=0.15

W f*R^{0.5}

1.34

1.36

1.38 1.4 1.42

1.44

1.46

1.48 1.5

40 60 80 100 120

y_{pos}=20

W f*R^{0.5}

1.4 1.45 1.5 1.55 1.6 1.65 1.7 1.75

40 60 80 100 120

y_{pos}=30

W f*R^{0.5}

1.4

1.5

1.6

1.7

1.8

40 60 80 100 120

y_{pos}=40

W f*R^{0.5}

1.5 1.55 1.6 1.65 1.7 1.75 1.8 1.85 1.9 1.95

40 60 80 100 120

y_{pos}=50

W f*R^{0.5}

1.5

1.6

1.7

1.8

1.9

40 60 80 100 120

y_{pos}=60

W f*R^{0.5}

1.5

1.6

1.7

1.8

1.9

40 60 80 100 120

y_{pos}=70

W f*R^{0.5}

1.5

1.6

1.7

1.8

1.9

40 60 80 100 120

y_{pos}=80

W f*R^{0.5}